)^2c

(GeV/

-πΛM

1.3 1.31 1.32 1.33 1.34

)^2c

Counts / (MeV/

0 10 20 30 40 50 60 70 -Ξ

80-100% V0A

= 5.02 TeV NNs p-Pb c < 1.2 GeV/ Tp 1.1 < < 0 y -0.5 <

ALICE